;
; Definition file of amdhip64_6.dll
; Automatic generated by gendef
; written by Kai Tietz 2008
;
LIBRARY "amdhip64_6.dll"
EXPORTS
; enum hipError_t __cdecl hipExtModuleLaunchKernel(struct ihipModuleSymbol_t *__ptr64,unsigned int,unsigned int,unsigned int,unsigned int,unsigned int,unsigned int,unsigned __int64,struct ihipStream_t *__ptr64,void *__ptr64 *__ptr64,void *__ptr64 *__ptr64,struct ihipEvent_t *__ptr64,struct ihipEvent_t *__ptr64,unsigned int)
?hipExtModuleLaunchKernel@@YA?AW4hipError_t@@PEAUihipModuleSymbol_t@@IIIIII_KPEAUihipStream_t@@PEAPEAX3PEAUihipEvent_t@@4I@Z
hipExternalMemoryGetMappedMipmappedArray
hipGraphAddExternalSemaphoresSignalNode
hipGraphAddExternalSemaphoresWaitNode
hipGraphExecExternalSemaphoresSignalNodeSetParams
hipGraphExecExternalSemaphoresWaitNodeSetParams
hipGraphExternalSemaphoresSignalNodeGetParams
hipGraphExternalSemaphoresSignalNodeSetParams
hipGraphExternalSemaphoresWaitNodeGetParams
hipGraphExternalSemaphoresWaitNodeSetParams
; enum hipError_t __cdecl hipHccModuleLaunchKernel(struct ihipModuleSymbol_t *__ptr64,unsigned int,unsigned int,unsigned int,unsigned int,unsigned int,unsigned int,unsigned __int64,struct ihipStream_t *__ptr64,void *__ptr64 *__ptr64,void *__ptr64 *__ptr64,struct ihipEvent_t *__ptr64,struct ihipEvent_t *__ptr64)
?hipHccModuleLaunchKernel@@YA?AW4hipError_t@@PEAUihipModuleSymbol_t@@IIIIII_KPEAUihipStream_t@@PEAPEAX3PEAUihipEvent_t@@4@Z
hipTexRefGetArray
hipTexRefGetBorderColor
AMD_CPU_AFFINITY DATA
AMD_DIRECT_DISPATCH DATA
AMD_GPU_FORCE_SINGLE_FP_DENORM DATA
AMD_LOG_LEVEL DATA
AMD_LOG_LEVEL_FILE DATA
AMD_LOG_MASK DATA
AMD_OCL_BUILD_OPTIONS DATA
AMD_OCL_BUILD_OPTIONS_APPEND DATA
AMD_OCL_LINK_OPTIONS DATA
AMD_OCL_LINK_OPTIONS_APPEND DATA
AMD_OCL_WAIT_COMMAND DATA
AMD_OPT_FLUSH DATA
AMD_SERIALIZE_COPY DATA
AMD_SERIALIZE_KERNEL DATA
AMD_THREAD_TRACE_ENABLE DATA
CL_KHR_FP64 DATA
CQ_THREAD_STACK_SIZE DATA
CUDA_VISIBLE_DEVICES DATA
DEBUG_CLR_GRAPH_PACKET_CAPTURE DATA
DEBUG_CLR_LIMIT_BLIT_WG DATA
DEBUG_HIP_GRAPH_DOT_PRINT DATA
DISABLE_DEFERRED_ALLOC DATA
GPU_ADD_HBCC_SIZE DATA
GPU_ANALYZE_HANG DATA
GPU_BLIT_ENGINE_TYPE DATA
GPU_CP_DMA_COPY_SIZE DATA
GPU_DEBUG_ENABLE DATA
GPU_DEVICE_ORDINAL DATA
GPU_DUMP_BLIT_KERNELS DATA
GPU_DUMP_CODE_OBJECT DATA
GPU_ENABLE_COOP_GROUPS DATA
GPU_ENABLE_HW_P2P DATA
GPU_ENABLE_LC DATA
GPU_ENABLE_PAL DATA
GPU_ENABLE_WAVE32_MODE DATA
GPU_ENABLE_WGP_MODE DATA
GPU_FLUSH_ON_EXECUTION DATA
GPU_FORCE_BLIT_COPY_SIZE DATA
GPU_FORCE_QUEUE_PROFILING DATA
GPU_IMAGE_BUFFER_WAR DATA
GPU_IMAGE_DMA DATA
GPU_MAX_COMMAND_BUFFERS DATA
GPU_MAX_HEAP_SIZE DATA
GPU_MAX_HW_QUEUES DATA
GPU_MAX_REMOTE_MEM_SIZE DATA
GPU_MAX_SUBALLOC_SIZE DATA
GPU_MAX_USWC_ALLOC_SIZE DATA
GPU_MAX_WORKGROUP_SIZE DATA
GPU_MIPMAP DATA
GPU_NUM_COMPUTE_RINGS DATA
GPU_NUM_MEM_DEPENDENCY DATA
GPU_PINNED_MIN_XFER_SIZE DATA
GPU_PINNED_XFER_SIZE DATA
GPU_PRINT_CHILD_KERNEL DATA
GPU_RESOURCE_CACHE_SIZE DATA
GPU_SINGLE_ALLOC_PERCENT DATA
GPU_STAGING_BUFFER_SIZE DATA
GPU_STREAMOPS_CP_WAIT DATA
GPU_USE_DEVICE_QUEUE DATA
GPU_WAVES_PER_SIMD DATA
GPU_XFER_BUFFER_SIZE DATA
HIPRTC_COMPILE_OPTIONS_APPEND DATA
HIPRTC_LINK_OPTIONS_APPEND DATA
HIPRTC_USE_RUNTIME_UNBUNDLER DATA
HIP_FORCE_DEV_KERNARG DATA
HIP_HIDDEN_FREE_MEM DATA
HIP_HOST_COHERENT DATA
HIP_INITIAL_DM_SIZE DATA
HIP_LAUNCH_BLOCKING DATA
HIP_MEM_POOL_SUPPORT DATA
HIP_MEM_POOL_USE_VM DATA
HIP_USE_RUNTIME_UNBUNDLER DATA
HIP_VISIBLE_DEVICES DATA
HIP_VMEM_MANAGE_SUPPORT DATA
HSA_KERNARG_POOL_SIZE DATA
HSA_LOCAL_MEMORY_ENABLE DATA
OCL_SET_SVM_SIZE DATA
OCL_STUB_PROGRAMS DATA
OPENCL_VERSION DATA
PAL_ALWAYS_RESIDENT DATA
PAL_DISABLE_SDMA DATA
PAL_EMBED_KERNEL_MD DATA
PAL_FORCE_ASIC_REVISION DATA
PAL_HIP_IPC_FLAG DATA
PAL_MALL_POLICY DATA
PAL_PREPINNED_MEMORY_SIZE DATA
PAL_RGP_DISP_COUNT DATA
REMOTE_ALLOC DATA
ROC_ACTIVE_WAIT_TIMEOUT DATA
ROC_AQL_QUEUE_SIZE DATA
ROC_CPU_WAIT_FOR_SIGNAL DATA
ROC_ENABLE_LARGE_BAR DATA
ROC_GLOBAL_CU_MASK DATA
ROC_HMM_FLAGS DATA
ROC_P2P_SDMA_SIZE DATA
ROC_SIGNAL_POOL_SIZE DATA
ROC_SKIP_KERNEL_ARG_COPY DATA
ROC_SYSTEM_SCOPE_SIGNAL DATA
ROC_USE_FGS_KERNARG DATA
__gnu_f2h_ieee
__gnu_h2f_ieee
__hipPopCallConfiguration
__hipPushCallConfiguration
__hipRegisterFatBinary
__hipRegisterFunction
__hipRegisterManagedVar
__hipRegisterSurface
__hipRegisterTexture
__hipRegisterVar
__hipUnregisterFatBinary
amd_dbgapi_get_build_id
amd_dbgapi_get_build_name
amd_dbgapi_get_git_hash
hipApiName
hipArray3DCreate
hipArray3DGetDescriptor
hipArrayCreate
hipArrayDestroy
hipArrayGetDescriptor
hipArrayGetInfo
hipBindTexture
hipBindTexture2D
hipBindTextureToArray
hipBindTextureToMipmappedArray
hipChooseDevice
hipChooseDeviceR0000
hipChooseDeviceR0600
hipConfigureCall
hipCreateChannelDesc
hipCreateSurfaceObject
hipCreateTextureObject
hipCtxCreate
hipCtxDestroy
hipCtxDisablePeerAccess
hipCtxEnablePeerAccess
hipCtxGetApiVersion
hipCtxGetCacheConfig
hipCtxGetCurrent
hipCtxGetDevice
hipCtxGetFlags
hipCtxGetSharedMemConfig
hipCtxPopCurrent
hipCtxPushCurrent
hipCtxSetCacheConfig
hipCtxSetCurrent
hipCtxSetSharedMemConfig
hipCtxSynchronize
hipDestroyExternalMemory
hipDestroyExternalSemaphore
hipDestroySurfaceObject
hipDestroyTextureObject
hipDeviceCanAccessPeer
hipDeviceComputeCapability
hipDeviceDisablePeerAccess
hipDeviceEnablePeerAccess
hipDeviceGet
hipDeviceGetAttribute
hipDeviceGetByPCIBusId
hipDeviceGetCacheConfig
hipDeviceGetDefaultMemPool
hipDeviceGetGraphMemAttribute
hipDeviceGetLimit
hipDeviceGetMemPool
hipDeviceGetName
hipDeviceGetP2PAttribute
hipDeviceGetPCIBusId
hipDeviceGetSharedMemConfig
hipDeviceGetStreamPriorityRange
hipDeviceGetUuid
hipDeviceGraphMemTrim
hipDevicePrimaryCtxGetState
hipDevicePrimaryCtxRelease
hipDevicePrimaryCtxReset
hipDevicePrimaryCtxRetain
hipDevicePrimaryCtxSetFlags
hipDeviceReset
hipDeviceSetCacheConfig
hipDeviceSetGraphMemAttribute
hipDeviceSetLimit
hipDeviceSetMemPool
hipDeviceSetSharedMemConfig
hipDeviceSynchronize
hipDeviceTotalMem
hipDriverGetVersion
hipDrvGetErrorName
hipDrvGetErrorString
hipDrvGraphAddMemcpyNode
hipDrvGraphAddMemsetNode
hipDrvMemcpy2DUnaligned
hipDrvMemcpy3D
hipDrvMemcpy3DAsync
hipDrvPointerGetAttributes
hipEventCreate
hipEventCreateWithFlags
hipEventDestroy
hipEventElapsedTime
hipEventQuery
hipEventRecord
hipEventRecord_spt
hipEventSynchronize
hipExtGetLastError
hipExtGetLinkTypeAndHopCount
hipExtLaunchKernel
hipExtLaunchMultiKernelMultiDevice
hipExtMallocWithFlags
hipExtModuleLaunchKernel
hipExtStreamCreateWithCUMask
hipExtStreamGetCUMask
hipExternalMemoryGetMappedBuffer
hipFree
hipFreeArray
hipFreeAsync
hipFreeHost
hipFreeMipmappedArray
hipFuncGetAttribute
hipFuncGetAttributes
hipFuncSetAttribute
hipFuncSetCacheConfig
hipFuncSetSharedMemConfig
hipGLGetDevices
hipGetChannelDesc
hipGetCmdName
hipGetDevice
hipGetDeviceCount
hipGetDeviceFlags
hipGetDeviceProperties
hipGetDevicePropertiesR0000
hipGetDevicePropertiesR0600
hipGetErrorName
hipGetErrorString
hipGetLastError
hipGetMipmappedArrayLevel
hipGetStreamDeviceId
hipGetSymbolAddress
hipGetSymbolSize
hipGetTextureAlignmentOffset
hipGetTextureObjectResourceDesc
hipGetTextureObjectResourceViewDesc
hipGetTextureObjectTextureDesc
hipGetTextureReference
hipGraphAddChildGraphNode
hipGraphAddDependencies
hipGraphAddEmptyNode
hipGraphAddEventRecordNode
hipGraphAddEventWaitNode
hipGraphAddHostNode
hipGraphAddKernelNode
hipGraphAddMemAllocNode
hipGraphAddMemFreeNode
hipGraphAddMemcpyNode
hipGraphAddMemcpyNode1D
hipGraphAddMemcpyNodeFromSymbol
hipGraphAddMemcpyNodeToSymbol
hipGraphAddMemsetNode
hipGraphChildGraphNodeGetGraph
hipGraphClone
hipGraphCreate
hipGraphDebugDotPrint
hipGraphDestroy
hipGraphDestroyNode
hipGraphEventRecordNodeGetEvent
hipGraphEventRecordNodeSetEvent
hipGraphEventWaitNodeGetEvent
hipGraphEventWaitNodeSetEvent
hipGraphExecChildGraphNodeSetParams
hipGraphExecDestroy
hipGraphExecEventRecordNodeSetEvent
hipGraphExecEventWaitNodeSetEvent
hipGraphExecHostNodeSetParams
hipGraphExecKernelNodeSetParams
hipGraphExecMemcpyNodeSetParams
hipGraphExecMemcpyNodeSetParams1D
hipGraphExecMemcpyNodeSetParamsFromSymbol
hipGraphExecMemcpyNodeSetParamsToSymbol
hipGraphExecMemsetNodeSetParams
hipGraphExecUpdate
hipGraphGetEdges
hipGraphGetNodes
hipGraphGetRootNodes
hipGraphHostNodeGetParams
hipGraphHostNodeSetParams
hipGraphInstantiate
hipGraphInstantiateWithFlags
hipGraphKernelNodeCopyAttributes
hipGraphKernelNodeGetAttribute
hipGraphKernelNodeGetParams
hipGraphKernelNodeSetAttribute
hipGraphKernelNodeSetParams
hipGraphLaunch
hipGraphLaunch_spt
hipGraphMemAllocNodeGetParams
hipGraphMemFreeNodeGetParams
hipGraphMemcpyNodeGetParams
hipGraphMemcpyNodeSetParams
hipGraphMemcpyNodeSetParams1D
hipGraphMemcpyNodeSetParamsFromSymbol
hipGraphMemcpyNodeSetParamsToSymbol
hipGraphMemsetNodeGetParams
hipGraphMemsetNodeSetParams
hipGraphNodeFindInClone
hipGraphNodeGetDependencies
hipGraphNodeGetDependentNodes
hipGraphNodeGetEnabled
hipGraphNodeGetType
hipGraphNodeSetEnabled
hipGraphReleaseUserObject
hipGraphRemoveDependencies
hipGraphRetainUserObject
hipGraphUpload
hipGraphicsGLRegisterBuffer
hipGraphicsGLRegisterImage
hipGraphicsMapResources
hipGraphicsResourceGetMappedPointer
hipGraphicsSubResourceGetMappedArray
hipGraphicsUnmapResources
hipGraphicsUnregisterResource
hipHccModuleLaunchKernel
hipHostAlloc
hipHostFree
hipHostGetDevicePointer
hipHostGetFlags
hipHostMalloc
hipHostRegister
hipHostUnregister
hipImportExternalMemory
hipImportExternalSemaphore
hipInit
hipIpcCloseMemHandle
hipIpcGetEventHandle
hipIpcGetMemHandle
hipIpcOpenEventHandle
hipIpcOpenMemHandle
hipKernelNameRef
hipLaunchByPtr
hipLaunchCooperativeKernel
hipLaunchCooperativeKernelMultiDevice
hipLaunchCooperativeKernel_spt
hipLaunchHostFunc
hipLaunchHostFunc_spt
hipLaunchKernel
hipLaunchKernel_spt
hipMalloc
hipMalloc3D
hipMalloc3DArray
hipMallocArray
hipMallocAsync
hipMallocFromPoolAsync
hipMallocHost
hipMallocManaged
hipMallocMipmappedArray
hipMallocPitch
hipMemAddressFree
hipMemAddressReserve
hipMemAdvise
hipMemAllocHost
hipMemAllocPitch
hipMemCreate
hipMemExportToShareableHandle
hipMemGetAccess
hipMemGetAddressRange
hipMemGetAllocationGranularity
hipMemGetAllocationPropertiesFromHandle
hipMemGetInfo
hipMemImportFromShareableHandle
hipMemMap
hipMemMapArrayAsync
hipMemPoolCreate
hipMemPoolDestroy
hipMemPoolExportPointer
hipMemPoolExportToShareableHandle
hipMemPoolGetAccess
hipMemPoolGetAttribute
hipMemPoolImportFromShareableHandle
hipMemPoolImportPointer
hipMemPoolSetAccess
hipMemPoolSetAttribute
hipMemPoolTrimTo
hipMemPrefetchAsync
hipMemPtrGetInfo
hipMemRangeGetAttribute
hipMemRangeGetAttributes
hipMemRelease
hipMemRetainAllocationHandle
hipMemSetAccess
hipMemUnmap
hipMemcpy
hipMemcpy2D
hipMemcpy2DAsync
hipMemcpy2DAsync_spt
hipMemcpy2DFromArray
hipMemcpy2DFromArrayAsync
hipMemcpy2DFromArrayAsync_spt
hipMemcpy2DFromArray_spt
hipMemcpy2DToArray
hipMemcpy2DToArrayAsync
hipMemcpy2DToArrayAsync_spt
hipMemcpy2DToArray_spt
hipMemcpy2D_spt
hipMemcpy3D
hipMemcpy3DAsync
hipMemcpy3DAsync_spt
hipMemcpy3D_spt
hipMemcpyAsync
hipMemcpyAsync_spt
hipMemcpyAtoH
hipMemcpyDtoD
hipMemcpyDtoDAsync
hipMemcpyDtoH
hipMemcpyDtoHAsync
hipMemcpyFromArray
hipMemcpyFromArray_spt
hipMemcpyFromSymbol
hipMemcpyFromSymbolAsync
hipMemcpyFromSymbolAsync_spt
hipMemcpyFromSymbol_spt
hipMemcpyHtoA
hipMemcpyHtoD
hipMemcpyHtoDAsync
hipMemcpyParam2D
hipMemcpyParam2DAsync
hipMemcpyPeer
hipMemcpyPeerAsync
hipMemcpyToArray
hipMemcpyToSymbol
hipMemcpyToSymbolAsync
hipMemcpyToSymbolAsync_spt
hipMemcpyToSymbol_spt
hipMemcpyWithStream
hipMemcpy_spt
hipMemset
hipMemset2D
hipMemset2DAsync
hipMemset2DAsync_spt
hipMemset2D_spt
hipMemset3D
hipMemset3DAsync
hipMemset3DAsync_spt
hipMemset3D_spt
hipMemsetAsync
hipMemsetAsync_spt
hipMemsetD16
hipMemsetD16Async
hipMemsetD32
hipMemsetD32Async
hipMemsetD8
hipMemsetD8Async
hipMemset_spt
hipMipmappedArrayCreate
hipMipmappedArrayDestroy
hipMipmappedArrayGetLevel
hipModuleGetFunction
hipModuleGetGlobal
hipModuleGetTexRef
hipModuleLaunchCooperativeKernel
hipModuleLaunchCooperativeKernelMultiDevice
hipModuleLaunchKernel
hipModuleLoad
hipModuleLoadData
hipModuleLoadDataEx
hipModuleOccupancyMaxActiveBlocksPerMultiprocessor
hipModuleOccupancyMaxActiveBlocksPerMultiprocessorWithFlags
hipModuleOccupancyMaxPotentialBlockSize
hipModuleOccupancyMaxPotentialBlockSizeWithFlags
hipModuleUnload
hipOccupancyMaxActiveBlocksPerMultiprocessor
hipOccupancyMaxActiveBlocksPerMultiprocessorWithFlags
hipOccupancyMaxPotentialBlockSize
hipPeekAtLastError
hipPointerGetAttribute
hipPointerGetAttributes
hipProfilerStart
hipProfilerStop
hipRegisterTracerCallback
hipRuntimeGetVersion
hipSetDevice
hipSetDeviceFlags
hipSetupArgument
hipSignalExternalSemaphoresAsync
hipStreamAddCallback
hipStreamAddCallback_spt
hipStreamAttachMemAsync
hipStreamBeginCapture
hipStreamBeginCapture_spt
hipStreamCreate
hipStreamCreateWithFlags
hipStreamCreateWithPriority
hipStreamDestroy
hipStreamEndCapture
hipStreamEndCapture_spt
hipStreamGetCaptureInfo
hipStreamGetCaptureInfo_spt
hipStreamGetCaptureInfo_v2
hipStreamGetCaptureInfo_v2_spt
hipStreamGetDevice
hipStreamGetFlags
hipStreamGetFlags_spt
hipStreamGetPriority
hipStreamGetPriority_spt
hipStreamIsCapturing
hipStreamIsCapturing_spt
hipStreamQuery
hipStreamQuery_spt
hipStreamSynchronize
hipStreamSynchronize_spt
hipStreamUpdateCaptureDependencies
hipStreamWaitEvent
hipStreamWaitEvent_spt
hipStreamWaitValue32
hipStreamWaitValue64
hipStreamWriteValue32
hipStreamWriteValue64
hipTexObjectCreate
hipTexObjectDestroy
hipTexObjectGetResourceDesc
hipTexObjectGetResourceViewDesc
hipTexObjectGetTextureDesc
hipTexRefGetAddress
hipTexRefGetAddressMode
hipTexRefGetFilterMode
hipTexRefGetFlags
hipTexRefGetFormat
hipTexRefGetMaxAnisotropy
hipTexRefGetMipMappedArray
hipTexRefGetMipmapFilterMode
hipTexRefGetMipmapLevelBias
hipTexRefGetMipmapLevelClamp
hipTexRefSetAddress
hipTexRefSetAddress2D
hipTexRefSetAddressMode
hipTexRefSetArray
hipTexRefSetBorderColor
hipTexRefSetFilterMode
hipTexRefSetFlags
hipTexRefSetFormat
hipTexRefSetMaxAnisotropy
hipTexRefSetMipmapFilterMode
hipTexRefSetMipmapLevelBias
hipTexRefSetMipmapLevelClamp
hipTexRefSetMipmappedArray
hipThreadExchangeStreamCaptureMode
hipUnbindTexture
hipUserObjectCreate
hipUserObjectRelease
hipUserObjectRetain
hipWaitExternalSemaphoresAsync
